en	Notification

en	Please select a notification.

en	Enable member self-activation (double opt-in)

en	By default, new members are disabled and have to be enabled by an administrator. If you want them to be able to self-activate their account, use this checkbox.

en	Activation notification

en	This notification is sent after the activation process (double opt-in) was completed.

en	Redirect page (successful activation)

en	Allows you to configure a different redirect page after successful activation.

en	Reset password page

en	It allows you to configure a different page for password resets. By default, the reset link redirects to the same page. However, you can specify a different page here, enabling you to differentiate the contents. Ensure you include this module again on the specified page.